; Tools/cdc 2.60 (22 Feb 1999) (NT/TOOLS)
; CAT Help Emitter $Revision: 1.27 $
;
; Catalog definitions for module "Author.book" (Author.book)
;
VERSION 9
REVISION 112
LANGUAGE "English"
NATURALNAME "Author"
MSG 0x09182c00 "Closes the current script.@pgClicking on the Close Script button brings up a confirmation dialog. Answering Yes closes the script. Answering No leaves the script open."
MSG 0x09183400 "Displays the name and path of the script you are currently working in.@pgUse the Script Switcher (to the left) to move to another open script."
MSG 0x09191000 "Opens a dialog allowing you to set an overall size for pages in the current script. This size applies regardless of the dimensions of individual pages' background images.@pgIf a different size has been specified for full screen playback in the Options dialog, it overrides the Script Size setting. The pages are then centered within the size specified in the Options dialog."
MSG 0x09191400 "Shows the current script's playback size."
MSG 0x09184400 "Moves you up the path out of the last group shown in the script title bar."
MSG 0x0918ac00 "Each row in the Main menu in which there is information represents a page in the script. The columns hold information or events associated with the page as a whole. The number of columns displayed depends upon the number of EX modules installed, which can vary.@pgYou can adjust the width and order of the columns to suit your requirements. To adjust the column width, place the pointer in the space between the column to be adjusted and the column to its right. When you press the main mouse button in this area, it highlights and you can then drag left to decrease or right to increase the column width.@pgTo reposition columns, drag the column heading to the left or right until it is in its desired position. (The No. and Name columns cannot be repositioned.)"
MSG 0x0918b400 "Lets you see other pages when there are more pages than can fit on the screen at once. Drag the bar up or down, or click in the empty area past either end to move it."
MSG 0x0918d400 "Lets you see other columns when there are more than can fit on the screen at once. Drag the bar left or right, or click in the empty area past either end to move it."
MSG 0x0918e000 "Displays miniature images of the graphic files in the current folder. Folder and file names appear underneath the images. Folders and non-graphic files such as scripts and sound files have special icons. Double-click on a folder icon to enter the folder. You can change the size of the Shuffler images by adjusting the File Shuffler Columns value control in the Options dialog."
MSG 0x09190c00 "Displays miniature images of the pages in the script, with the page names underneath. Groups, sub-scripts, and special event pages (such as sound files) all have distinctive appearances. Drag a miniature image to re-order the pages. You can change the size the Shuffler images by adjusting the Main Shuffler Columns value control in the Options dialog."
MSG 0x09180000 "Accepts changes and closes the menu."
MSG 0x09180800 "Closes the menu, discarding any changes you made."
MSG 0x0918c800 "Shows the position of a page in the sequence of the script. Click on a button in this column to display the Page Control menu. If the No. button contains a number, the selected page, group or sub-script is \"on\". When the button says \"Off\", the page is still in the script, but is not displayed when the script runs."
MSG 0x0918d800 "Shows the position of an element in the sequence of the page. Click on a button in this column to display the Element Control menu. If the No. button contains a number, the selected element is \"on\". When the button says \"Off\", the element is still in the page, but is not displayed when the page runs."
MSG 0x09181000 "Lets you turn a page on or off, and allows you to change its name. Turn the page on or off by clicking on the Active? button. Change the page name by editing the Name: text.@pgClick OK to accept changes or Cancel to discard them."
MSG 0x09181400 "Lets you turn an element on or off, and allows you to change its name. Turn the element on or off by clicking on the Active? button. Change the element name by editing the Name: text.@pgClick OK to accept changes or Cancel to discard them."
MSG 0x09181800 "Turns the page on or off."
MSG 0x09181c00 "Turns the element on or off."
MSG 0x09182000 "Changes the page name."
MSG 0x09182400 "Changes the element name."
MSG 0x0918cc00 "Shows the name of the screen page, group, special event or sub-script.@pgClick once on a Name button to select a page without opening a menu or dialog. Double-click on a screen page to open a Design menu. Which Design menu that opens depends on the type of element that is first on the page. Double-click on a group to move down a level and see its component pages. You can change the order of pages by dragging them up or down to a new position.@pgSelect several pages at once by Shift-clicking or Ctrl-clicking."
MSG 0x0918dc00 "Displays the names of individual elements. (Out wipe events have the same name as the related element, but the name is preceded by Out:.) Click to select an element. Change the order in which events take place by dragging an Element button to a new position."
